-- Database: Blink

-- DROP DATABASE IF EXISTS "Blink";

CREATE DATABASE "Blink"
    WITH
    OWNER = pg_database_owner
    ENCODING = 'UTF8'
    LC_COLLATE = 'Italian_Italy.1252'
    LC_CTYPE = 'Italian_Italy.1252'
    TABLESPACE = pg_default
    CONNECTION LIMIT = -1
    IS_TEMPLATE = False;