/* CHAPTER 13. Images. */

/*
 * Get image data, including resolution at all points of use. Call
 * cpdf_startGetImageResolution(pdf, min_required_resolution) will begin the
 * process of obtaining data on all image uses below min_required_resolution,
 * returning the total number. So, to return all image uses, specify a very
 * high min_required_resolution. Then, call the other functions giving a
 * serial number 0..<total number> - 1, to retrieve the data. Finally, call
 * cpdf_endGetImageResolution to clean up.
 */
int cpdf_startGetImageResolution(int, float);
int cpdf_getImageResolutionPageNumber(int);
char *cpdf_getImageResolutionImageName(int);
int cpdf_getImageResolutionXPixels(int);
int cpdf_getImageResolutionYPixels(int);
double cpdf_getImageResolutionXRes(int);
double cpdf_getImageResolutionYRes(int);
void cpdf_endGetImageResolution(void);

