/* CHAPTER 0. Preliminaries */

/** Initialises the library. Must be called before any other function. */
public native void startup() throws CpdfError;

/** Returns a string giving the version number of the Jcpdf library. */
public native String version() throws CpdfError;

/** Sets fast mode. Some operations have a fast mode. The default is 'slow'
mode, which works even on old-fashioned files. For more details, see
section 1.13 of the CPDF manual. This functions sets the mode to fast
globally. */
public native void setFast() throws CpdfError;

/** Sets slow mode. Some operations have a fast mode. The default is 'slow'
mode, which works even on old-fashioned files. For more details, see
section 1.13 of the CPDF manual. This functions sets the mode to slow
globally. */
public native void setSlow() throws CpdfError;

/** Prints some information about
resource usage. This can be used to detect if PDFs or ranges are being
deallocated properly. Contrary to its name, it may be run at any time. */
public native void onExit();
