CHAPTER 0. Preliminaries

Cpdf.startup


Initialises the library. Must be called before any other function.


Cpdf.version


Returns a string giving the version number of the CPDF library.


Cpdf.setFast


Some operations have a fast mode. The default is 'slow' mode, which works
even on old-fashioned files. For more details, see section 1.13 of the
CPDF manual. This function sets the mode to fast globally.


Cpdf.setSlow


Some operations have a fast mode. The default is 'slow' mode, which works
even on old-fashioned files. For more details, see section 1.13 of the
CPDF manual. This functions sets the mode to slow globally.


Cpdf.lastError


Not to be called directly. Errors in .NET cpdf are raised by exceptions.


Cpdf.lastErrorString


Not to be called directly. Errors in .NET cpdf are raised by exceptions.


Cpdf.clearError


Not to be called directly. Errors in .NET cpdf are raised by exceptions.


Cpdf.onExit


A debug function which prints some information about
resource usage. This can be used to detect if PDFs or ranges are being
deallocated properly. Contrary to its name, it may be run at any time.


Cpdf.dummych1

